Rational Software Corporation^®

RATIONAL^® CLEARCASE^® LT

INSTALLATIONGUIDE

VERSION: 2002.05.00 ANDLATER PART NUMBER: 800-025076-000

WINDOWS EDITION

Installation Guide Document Number 800-025076-000 October 2001 Rational Software Corporation 20 Ma guire Road Le xington, Massac husetts 02421

IMPORTANT NOTICE

Copyright Copyright © 1992, 2001 Rational Softwar e Corporation. All rights r eserved. Copyright 1989, 1991 The Regents of the University of California Copyright 1984–1991 by Raima Corporation

Permitted Usage THIS DOCUMENT ISPROTECTED BYCOPYRIGHT AND CONTAINS INFORMA TION PROPRIETARYTO RATIONAL. ANY COPYING, ADAPT ATION, DISTRIBUTION, OR PUBLIC DISPLA Y OF THIS DOCUMENT WITHOUT THE EXPRESSWRITTEN CONSENT OF RATIONAL IS STRICTLYPROHIBITED. THE RECEIPT OR POSSESSION OF THIS DOCUMENT DOES NOT CONVEY ANY RIGHTS T O REPRODUCE OR DISTRIBUTE ITS CONTENTS, OR T O MANUF ACTURE, USE, OR SELL ANYTHING THAT IT MAY DESCRIBE, IN WHOLE OR IN P ART, WITHOUT THE SPECIFIC WRITTEN CONSENT OF RATIONAL.

Trademarks Rational, Rational Softwar e Corporation, the Rational logo, Rational the e-development company , Rational Suite ContentStudio, ClearCase, ClearCase MultiSite ClearQuest, Object Testing, Object-Oriented Recording, Objectory , PerformanceStudio, Pur eCoverage, Pur eDDTS, Pur eLink, Purify , Purify'd, Quantify , Rational Apex, Rational CRC, Rational PerformanceAr chitect, Rational Rose, Rational Suite, Rational Summit, Rational Unified Pr ocess, Rational V isual Test, Requisite, RequisitePr o, RUP, SiteCheck, SoDA, T estFactory , TestMate, TestStudio, The Rational W atch, among others ar e trademarks or r egister ed trademarks of Rational Softwar e Corporation in the United States and in other countries. All other names are used for identification purposes only, and ar e trademarks or r egister ed trademarks of their r espective companies. Sun, Solaris, and Java ar e trademarks or r egister ed trademarks of Sun Micr osystems, Inc. Microsoft, the Micr osoft logo, the Micr osoft Internet Explor er logo, W indows, the W indows logo, Windows NT, the Windows Start logo ar e trademarks or r egister ed trademarks of Micr osoft Corporation in the United States and other countries. FLEXlm and GLOBEtrotter are trademarks or register ed trademarks of GLOBEtrotter Softwar e, Inc. Licensee shall not incorporate any Globetr otter softwar e (FLEXlm libraries and utilities) into any product or application the primary purpose of which is softwar e license management.

Patent U.S. Patent Nos. 5,193,180and 5,335,344and 5,535,329and 5,574,898and 5,649,200and 5,675,802and 5,835,701. Additional patents pending.

Government Rights Legend Use, duplication, or disclosur e by the U.S. Government is subject to r estrictions set forth in the applicable Rational License Agr eement and in DF ARS 227.7202-1(a) and 227.7202-3(a) (1995), DFARS 252.227-7013(c)(1)(ii) (Oct 1988), FAR 12.212(a) 1995, FAR 52.227-19, or FAR 52.227-14, as applicable.

Warranty Disclaimer This document and its associated softwar e may be used as stated in the underlying license agreement. Rational Softwar e Corporation expr essly disclaims all other warranties, expr ess or implied, with r espect to the media and softwar e product and its documentation, including without limitation, the warranties of merchantability or fitness for a particular purpose or arising fr om a course of dealing, usage, or trade practice.

Technical Acknowledgments This softwar e and documentation is based in part on BSD Networking Softwar e Release 2, licensed fr om the Regents of the University of California. W e acknowledge the r ole of the Computer Systems Resear ch Group and the Electrical Engineering and Computer Sciences Department of the University of California at Berkeley and the Other Contributors in its development. This pr oduct includes softwar e developed by Gr eg Stein <gstein@lyra.or g> for use in the mod_dav module for Apache (http://www .webdav .org/mod_dav/).

Contents iii

/vobs/doc/ccase/install/cc_install.cclt.suite.winTOC.fm — September 16, 2001 3:49 am

Contents

Preface ...................................................................................................................................... vii 0.1 Overview .......................................................................................................... vii 0.2 Audience ..........................................................................................................viii 0.3 Other Resources ..............................................................................................viii 0.4 Contacting Rational Technical Publications ...................................................x 0.5 Contacting Rational Technical Support ..........................................................x 0.6 Licensing Support .............................................................................................xi

1. Before You Install ................................................................................................................1 1.1 General Requirements .......................................................................................2 ClearCase LT Server and Client Hosts ............................................................3 1.2 System and Software Requirements ................................................................4 1.3 Windows NT Domain Membership Requirements ......................................5 1.4 Selecting a ClearCase LT Server Host .............................................................6 Cross-Platform VOB Move and Client Access Limitations ..........................6 Server Configuration Guidelines .....................................................................7 1.5 Configuring ClearCase LT Licensing ..............................................................8 Configuring ClearCase LT to Use a Floating License ...................................8 Configuring ClearCase LT to Use a Node-Locked License .........................8 1.6 Who Can Install? ................................................................................................9 Special Requirements for Server Setup ...........................................................9

2. Installing Rational ClearCase LT ...................................................................................11 2.1 Installing ClearCase LT with Rational Software Setup .............................11 Upgrade Compatibility ...................................................................................14 2.2 Other Installation Options ..............................................................................15 Installing ClearCase LT Client as Part of a Rational Suite .........................15 Installing ClearCase LT for Evaluation Purposes .......................................15 Upgrading From a Previous Release of ClearCase LT ...............................15 iv Installation Guide: Rational ClearCase LT

/vobs/doc/ccase/install/cc_install.cclt.suite.winTOC.fm — September 16, 2001 3:49 am

3. After You Install Rational ClearCase LT .......................................................................17 3.1 Configuring the ClearCase LT Server ............................................................17 Running the Server Setup Wizard .................................................................17 Importing Files into ClearCase .......................................................................18 Additional Administrative Tasks ...................................................................18 3.2 Configuring ClearCase LT Clients .................................................................19 Set the CLEARCASE_PRIMARY_GROUP Environment Variable ...........19 Ensure Compatible Language Settings .........................................................20 Install Internet Explorer if Necessary ............................................................20 Creating Views ..................................................................................................20 3.3 Removing ClearCase LT..................................................................................21 Removing ClearCase LT Software .................................................................21 Removing ClearCase LT Data .........................................................................21 ClearCase LT Documentation .........................................................................22

Preface

About This Manual

This document pr ovides the information you need to install and configur e a Rational ClearCase LTserver or ClearCase LTclient as part of a Rational Suite or as a stand-alone product. Rational ClearCase LT is a softwar e configuration management solution for project workgr oups. ClearCase LT offers Rational Unified Change Management (UCM), a best-practices-based softwar e development process that enables project teams to manage change at the activity level and contr ol workflow .Enterprise customers who requir e distributed servers or server replication can upgrade to Rational ClearCase from ClearCase LTwithout changing their process, their data, or the way they work. This manual pr ovides: Information about steps you should take befor e you install ClearCase LT. Information needed to perform a typical installation of ClearCase LT. Notes on configuring the ClearCase LT server after installation is complete. Information needed to r emove ClearCase LT from your system.

vi Installation Guide: Rational ClearCase LT

Audience

This guide is intended for anyone who is installing a ClearCase LTserver or client on a computer running a supported version of Microsoft Windows. It assumes a basic knowledge of Microsoft Windows and its conventions.

Other Resour ces

Online Help is available for Rational ClearCase LT. Click Start > Programs > Rational ClearCase LT Client > ClearCase LT Help .

All manuals ar e available online in PDF format. The online manuals ar e installed with the product. To view them, click Start > Programs > Rational ClearCase LT Client > ClearCase LT Help or Start > Programs > Rational ClearCase LT Server > ClearCase LT Help .

The Rational Suite LicenseManagement Guide,included with your installation materials, describes the Web-based license manager AccountLink, the Rational License Key Administrator , and the Rational softwar e licensing model. This manual also provides instr uctions and troubleshooting information for acquiring, installing, and configuring licenses. Y ou must install license keys to use Rational pr oducts; you can install them befor e or after you install the pr oducts.

For mor e information about Rational Softwar e technical publications, see www .rational.com/support/products/clearcase.jsp .

For mor e information on training opportunities, see the Rational University W eb site at www .rational.com/university .

ClearCase LT Documentation Roadmap

viii Installation Guide: Rational ClearCase LT

Typographical Con ventions

This manual uses the following typographical conventions:

ccase-home-dir represents the dir ectory into which the ClearCase Pr oduct Family has been installed. By default, this dir ectory is /usr/atria on UNIX and C:\Program Files\Rational\ClearCase on Windows.

attache-home-dir represents the dir ectory into which ClearCase Attache has been installed.

By default, this dir ectory is C:\Program Files\Rational\Attache , except on W indows 3. x, wher e it is C:\RA TIONAL\A TTACHE .

Bold is used for names the user can enter; for example, all command names, file names, and branch names.

Italic is used for variables, document titles, glossary terms, and emphasis.

A monospaced font is used for examples. Wher e user input needs to be distinguished

from pr ogram output, bold is used for user input.

Nonprinting characters ar e in small caps and appear as follows: <EOF>, <NL>.

Key names and key combinations ar e capitalized and appear as follows: SHIFT , CTRL+G.

[ ] Brackets enclose optional items in format and syntax descriptions.

{ } Braces enclose a list fr om which you must choose an item in format and syntax descriptions.

| A vertical bar separates items in a list of choices.

... In a syntax description, an ellipsis indicates you can r epeat the pr eceding item or line one or mor e times. Otherwise, it can indicate omitted information.

NOTE: In certain contexts, ClearCase recognizes “...”within a pathname as a wildcar d, similar

to “*” or “?”. See the wildcards_ccase reference page for mor e information.

If a command or option name has a short form, a “medial dot” ( ⋅ ) character indicates the shortest legal abbr eviation. For example:

lsc·heckout

This means that you can tr uncate the command name to lsc or any of its intermediate spellings ( lsch , lsche , lschec , and so on).

Preface ix

Technical Suppor t

If you have any problems with the softwar e or documentation, please contact Rational Technical Support via telephone, fax, or electr onic mail as described below . For information r egarding support hours, languages spoken, or other support information, click the Technical Support link on the Rational W eb site at www .rational.com .

Your Location Telephone Facsimile Electronic Mail

North America 800-433-5444 toll free or 408-863-4000 Cupertino, CA

408-863-4194 Cupertino, CA 781-676-2460 Lexington, MA support@rational.com

Europe, Middle East, and Africa

+31-(0)20-4546-200 Netherlands

+31-(0)20-4546-201 Netherlands support@europe.rational.com

Asia Pacific 61-2-9419-0111 Australia

61-2-9419-0123 Australia support@apac.rational.com

x Installation Guide: Rational ClearCase LT

1 - Before You Install 1

1 1 Before You Install

This chapter pr esents system r equir ements and general guidelines to help you pr epar e for installing or upgrading Rational ClearCase LT. Before you install or upgrade this softwar e product, take the following steps:

Review the general r equir ements for installing a Rational Softwar e product.

Know the name of the computer that is (or will be) the ClearCase LT server .

Verify that all computers on which you plan to install ClearCase LT are members of a Windows NT domain, and that all users who will use ClearCase LT have accounts in a Windows NT domain.

Designate one domain gr oup as the Rational ClearCase Users Gr oup—the one to which all ClearCase LT users will belong.

Install and configur e a license server host if necessary . You need a license server host if you want to use floating licenses. Y ou do not need a license server host if you want to use node-locked licenses. For mor e information about licenses and setting up a license server host, see the Rational Suite License Management Guide.

2 Installation Guide: Rational ClearCase LT

1.1 General Requirements

Here is a list of general requir ements for installing Rational ClearCase LT (or any Rational Suite Product) for the first time at your site.

1. Make sur e that you have a curr ent backup of the W indows Registry and system dir ectories on any host wher e ClearCase LT will be installed.

2. Decide whether you will use node-locked or floating licenses. Y ou must install Rational licenses to use Rational products. See the Rational Suite LicenseManagement Guidefor general information about licenses, including the pr ocedur e for obtaining a license key . See Configuring ClearCase LT Licensing on page 8 for information specific to ClearCase LT licensing.

3. The Rational Softwar e Installation procedur e uses C:\Program Files\Rational as the default install path for ClearCase LT softwar e. The instr uctions in this guide assume that you ar e installing Windows applications on drive C. If this is not the case, substitute the appr opriate drive when performing all pr ocedur es

If drive C lacks suf ficient fr ee disk space, you can either specify another drive during the installation pr ocedur e or make space available on the default drive. Even if you choose another install path, some files must be installed on drive C. The Rational Softwar e Setup program will r eport the amount of space r equir ed on all drives for your installation.

After ClearCase LT has been installed, you can select any drive on the system to pr ovide storage for ClearCase VOB and view data.

NOTE: If you have alr eady installed a Rational pr oduct, you cannot select an alternate

location for another Rational pr oduct installation.

4. The ClearCase LT installation r equir es specific versions of Micr osoft files whether you ar e installing ClearCase LT for the first time or upgrading ClearCase LT from an earlier version. You can let the Rational Softwar e Setup pr ogram install the files, or you can install the files from other sour ces.

5. Rational Suite cannot be installed on a system that can boot multiple W indows NT, Windows 98, or Windows Me installations. Y ou can install ClearCase LT on such a system, but you must install it in separate dir ectories for each version of the operating system. For more information, see the Release Notesfor Rational ClearCase LT.

1 - Before You Install 3

If you are using ClearCase LT with other products from the Rational Suite, all products must be from the same Suite version (installed from the same CD). For information about the order in which you should upgrade integrated pr oducts and convert schemas and data, see Configuring Rational Suite and the Release Notesfor Rational Suite .

ClearCase LT Server and Client Hosts

ClearCase LT is a client/server pr oduct. A ClearCase LT community consists of a ClearCase LT server and one or more ClearCase LT clients. You may have multiple ClearCase LT communities at your site, but each client in a community can access only one ClearCase LT server . You can install a ClearCase LTclient without installing a ClearCase LTserver ,but the client will not work until the server is installed and accessible by the client. The server host should be adequately configur ed. See Selecting a ClearCaseLT Server Host on page 6.

Installing ClearCase LT server softwar e on a host also installs ClearCase LT client softwar e on that host. Y ou do not need (and ar e not permitted) to install ClearCase LT client softwar e on a ClearCase LT server . ClearCase LT client softwar e is installed on the Clear case LT server to simplify evaluation, administration, and troubleshooting. If you are part of a small workgr oup, you may want to use the ClearCase LT server as a client too, but we r ecommend using a dedicated server whenever possible.

NOTE: ClearCase LT cannot be installed on a computer that is a Rational ClearCase host. If you

have installed Rational ClearCase on any host that you intend to use as a ClearCase LT client or server , you must uninstall ClearCase on that host befor e you can install ClearCase LT.

4 Installation Guide: Rational ClearCase LT

1.2 System and Software Requirements

Table 1 lists the system and softwar e requir ements for installing ClearCase LT.

Table 1 ClearCase LT Requir ements

Item Minimum Requirements

Operating System Windows NT 4.0, SP4, SP5, SP6a Windows 2000, SP1 Windows Me (ClearCase LT Client only) Windows 98 all versions (ClearCase LT Client only)

Additional requir ements for Windows 98and Windows Me

Client for Micr osoft Networks TCP/IP

ClearCase LT Server Pr ocessor Pentium class pr ocessor 128 MB RAM

ClearCase LT Client Pr ocessor Pentium class pr ocessor 64 MB RAM

Supported File Systems: Windows NT Windows 98, Windows Me Windows 2000

FAT, NTFS, LANMAN, NFS FAT, FAT32 FAT, FAT32, NTFS, LANMAN

ClearCase LT Server Disk Space The server also needs enough disk space to contain the files and databases used for storage. The amount of space r equir ed depends on the characteristics and use of the VOBs and views.

70 MB

1 - Before You Install 5

1.3 Windows NT Domain Membership Requirements

When installed on any W indows platform, the ClearCase LT server and its clients must be members of a Windows NT domain. To use ClearCase LTfrom any Windows platform, you must log on to a domain account (not a local, per -system user account).

All ClearCase LT users at your site should have accounts in the same domain if possible. Otherwise, you must configur e ClearCase LT to allow access to ClearCase data by users in multiple domains using the pr ocedur es described in the Administrator ’s Guide for Rational ClearCase LT. In addition, all of the ClearCase LT users in a domain must be members of a domain gr oup that your ClearCase LT administrator has designated as the ClearCase Users Group. See Special Requirements for Server Setup on page 9 and the Administrator ’s Guide for Rational ClearCase LTfor more information about domain group membership requir ements and domains in general.

ClearCase LT Client Disk Space The client also needs enough disk space to contain all files loaded into snapshot views and all view-private files added to the views. The amount of space r equir ed depends on the number and sizes of the files in the views.

60 MB

Optional softwar e An Adobe Acrobat Reader to access the online manuals, which ar e in .pdf format.

A Web browser on any system that accesses ClearCase LT through the Web interface, either Netscape 4.5 or later, or Internet Explor er 4.0.1 (SP 1) or later . (Note that it is not necessary to install ClearCase LT on such a system.)

Item Minimum Requirements

6 Installation Guide: Rational ClearCase LT

NOTE : You may install ClearCase LT on a nondomain Windows NT or Windows 2000 host if the

host does not need to communicate with other ClearCase LT clients or servers and will be used only by one person. This type of configuration is not practical for pr oduction use, but may simplify an evaluation of ClearCase LT.

1.4 Selecting a ClearCase LT Server Host

We recommend that you install the ClearCase LT server befor e you install any ClearCase LT clients. The characteristics of the ClearCase LT server ar e critical to the performance and scalability of your entir e ClearCase LTcommunity .Selecting an appr opriate ClearCase LTserver host is an important pr e installation step.

NOTE: A ClearCase LT client on W indows can access a ClearCase LT server r unning either

Windows NT or UNIX. If your site is using a ClearCase LT server running UNIX, you may skip the remainder of this section. See the Platform-SpecificGuide in online help for information about installing and configuring a ClearCase LT server on UNIX.

Cross-Platf orm VOB Move and Client Access Limitations

A ClearCase LT server r unning W indows NT is fully inter operable with ClearCase LT clients running either W indows or UNIX operating systems. However , if you upgrade it to ClearCase, the server cannot pr ovide unr estricted VOB or view access to UNIX computers r unning ClearCase. The most significant r estriction is that a ClearCase VOB server host r unning Windows NT cannot support ClearCase dynamic views on a UNIX host.

Moving a VOB between Windows NT and UNIX is not easy. When choosing a platform for your ClearCase LT server , take these issues into account:

Whether or not you plan to upgrade to ClearCase, choose a ClearCase LT server platform type that will be appr opriate for your community both now and in the futur e. Changing your ClearCase LT server fr om a W indows NT platform to a UNIX platform, or vice versa, is very dif ficult.

If ther e is any possibility that you will upgrade your ClearCase LT server to ClearCase and provide unr estricted access to the server fr om ClearCase clients r unning UNIX, select a UNIX computer for your ClearCase LT server .

1 - Before You Install 7

For mor e information on r estrictions that apply to moving VOBs, see the Administrator ’s Guide for Rational ClearCase LT.

Server Configuration Guidelines

To ensur e adequate performance for all ClearCase LT clients, we r ecommend that you install ClearCase LT server softwar e on a computer that meets or exceeds the following r equir ements:

Main memory (RAM). The minimum r ecommended main memory size is 128 MB or half the size of all the VOB databases the server will host, whichever is gr eater. To this amount, add 7 MB of memory per VOB, r egardless of VOB database size. Adequate physical memory is the most important factor in ClearCase LT server performance.

Disk capacity . A VOB database must fit in a single disk partition, and VOB databases tend to grow significantly as development pr oceeds and pr ojects matur e. We recommend a high-performance disk subsystem, one with high rotational speed, low seek times, and high capacity . If possible, use a RAID or similar disk subsystem that takes advantage of disk striping and mirr oring.

Processing power . A ClearCase LT server must have adequate CPU capacity .

The definition of adequate in this context varies from one hardwar e architectur e to another . For ClearCase LT and similar enterprise applications, server CPU capacity is a critical factor in performance of client operations. Make the most of the available server CPU cycles by keeping nonessential processes off the ClearCase LT server . The ClearCase LT server should not have to perform any other r esour ce-intensive tasks, such as hosting a thir d-party database, hosting a busy W eb server , or acting as a primary domain contr oller.

High Availability . The ClearCase LT server should be a robust system that does not need to be rebooted or taken of fline fr equently . It should be easily accessible over the network—on the same subnet as or at most one or two network hops fr om any ClearCase LT client.

Adequate access rights. Windows NT and W indows 2000 limit concurr ent network access to systems on which W indows NT Workstation or W indows 2000 Professional softwar e is installed to a maximum of 10 systems. If you anticipate that mor e than 10 ClearCase LT clients will need to access the ClearCase LT server simultaneously , install W indows NT Advanced Server or W indows 2000 Server softwar e on your ClearCase LT server host.

NOTE: We recommend that you install ClearCase LT server on a dedicated host for optimal

performance during production use. However , for evaluation purposes or for very small teams, you can install and r un ClearCase LT server and a Rational Suite on a single host.

8 Installation Guide: Rational ClearCase LT

1.5 Configuring ClearCase LT Licensing

You may configur e licensing during the installation process or after the installation is complete. Until licensing is pr operly configur ed, you cannot r un ClearCase LT.

All license configuration is managed thr ough the Rational License Key Administrator . The License Key Administrator is installed the first time you install ClearCase LT or any Rational Suite. You can r un the License Key Administrator in two ways:

Click Confi gure Licensing in the Rational Softwar e Setup pr ogram.

Click Start > Programs > Rational Suite Enterprise > License Key Administrator Start .

ClearCase LT can use a floating license or a node-locked license. Before you configur e a license, ask your ClearCase LT administrator which type of license your site uses.

Configuring ClearCase LT to Use a Floating License

If your site uses floating licenses, you need the name of the FLEXlm license server host befor e you begin to install ClearCase LT. To configur e a floating license for ClearCase LT, use the License Key Administrator to select a FLEXlm license server on which ClearCase LT floating licenses have been installed. If you need to install floating licenses on a FLEXlm license server , see the Rational Suite License Management Guide for mor e information.

Configuring ClearCase LT to Use a Node-Locked License

The pr ocedur e you follow to configur e ClearCase LT to use a node-locked license depends on how you and your ClearCase LT administrator decide to manage license configuration.

If you ar e going to use a temporary or evaluation license, you will need a copy of your License Key Certificate that shipped with the Rational Suite r elease media. The temporary or evaluation key is on the certificate.

If you ar e going to import your node-locked license fr om an existing license file you need the path to that file.

If you are going to request a license from the Rational AccountLink Web site, you will need to know your Rational Account Number befor e you can r equest the license.

1 - Before You Install 9

The License Key Administrator pr ovides options for each of these methods of configuring a node-locked license. Select the method you want, and follow the instr uctions to acquir e and install the license. After you have installed the node-locked license, use the License Usage Mapper to specify that ClearCase LT is to use the Rational Suite key. Rational does not provide a stand-alone node-locked license for ClearCase LT.

The Rational Suite License Management Guide provides complete information about Rational’s licensing policies and tools.

1.6 Who Can Install?

To install ClearCase LT on a Windows NT or W indows 2000 system, you must have Administrator privileges on the local system. You have local Administrator privileges if you are logged on to local host as administrator, or if your domain account (for example DOMAIN\ you) is also a member of the administrators gr oup in the local host’s account database.

Local administrator privileges ar e the only r equir ement for installing ClearCase LT client or server . If you are installing ClearCase LT on a server for the first time, the server cannot be used until the ClearCase LT Server Setup W izard, which has additional identity r equir ements, has been r un.

Special Requirements f or Server Setup

After the ClearCase LT server softwar e has been installed for the first time, the ClearCase LT Server Setup W izard runs. The Server Setup W izard does not r un if you ar e upgrading an existing ClearCase LT server to a new release, or if you are reinstalling ClearCase LT server on a host that has alr eady been configur ed by the Server Setup W izard.

The Server Setup W izard creates thr ee VOBs: one to hold objects r equir ed by the ClearCase LT on-line tutorial, one to hold UCM objects for the initial project, and one to hold sour ce code (files and dir ectories) for this pr oject.

ClearCase access contr ols requir e the user who cr eates a VOB and all users who access it to be members of the same gr oup. W e refer to this gr oup as the ClearCase Users Group. To satisfy this requir ement and because the Server Setup Wizard creates several VOBs, you must be logged on as a member of the ClearCase Users Gr oup when you r un the Server Setup W izard.

10 Installation Guide: Rational ClearCase LT

If you can log on as a user who is both a local administrator on the ClearCase LT server host and a member of the ClearCase Users Gr oup, do so. It will simplify installation and setup of the ClearCase LT server .

If you cannot log on as a user with this combination of group memberships, you can still install ClearCase LT with local administrator privileges. Y ou will not be able to complete server setup until you log out, and then log on as a member of the ClearCase Users Gr oup.

2 - Installing Rational ClearCase LT 11

2 2 Installing Rational ClearCase L T

This chapter describes how to use the Rational Softwar e Setup pr ogram to install Rational ClearCase LT on a server or client host. W e recommend that you install and configur e the ClearCase LTserver before you install the ClearCase LTclient or any Rational Suite that includes a ClearCase LT client.

2.1 Installing ClearCase LT with Rational Software Setup

CAUTION: Interr upting an installation that is in pr ogress may leave your system in an

indeterminate state. Ifyou try to close the Rational Softwar e Setup window while the installation is in pr ogress, you ar e asked to confirm that you want to exit fr om the incomplete installation.

This section describes a typical installation of ClearCase LT. Client and server installations ar e similar , but ther e are special r equir ements when you install a ClearCase LT server for the first time.

1. Log in as a user with Administrator rights on the local host. See Who Can Install? on page 9 for more information about who can install ClearCase LT,and for special considerations that apply when r unning the ClearCase LT Server Setup W izard.

2. Insert the Rational Solutions for Windows Disc 1 CD into the CD drive. The setup program starts automatically .

If autor un is disabled on your system, click Start > Run . Enter cd_drive:\SETUP .EXE.

The Rational Softwar e Setup Pr ogram guides you thr ough the softwar e installation. In each dialog box, click Next to open the next one.

12 Installation Guide: Rational ClearCase LT

3. The Rational Software Setup dialog box pr ovides general information about the softwar e installation. Click Next to open the Choose Product to Install dialog box.

4. The Choose Product to Install dialog box lists all pr oducts available for installation. Select the product you want to install (Rational ClearCase LT Server,Rational ClearCase LT Client, or any Rational Suite that includes Rational ClearCase LT Client).

ClearCase LT requir es a license. If an appr opriate license has not been installed and configur ed, a red Xappears to the left of the product name. You can configur e licenses now or wait until after installation is complete.

To configur e licenses now , click Confi gure Licensing . The License Key Administrator runs, after which the installation pr ocess resumes.

To configur e licensing later , click Next . A message box r eminds you that you ar e installing a pr oduct that r equir es licensing even though the licensing has not yet been configur ed. You may r un the License Key Administrator after installation is complete.

For mor e information about configuring licenses for ClearCase LT, see Configuring ClearCaseLT Licensing on page 8.

5. The License Agreement dialog box displays the Rational Softwar e license agr eement.

If you accept the license agr eement, the installation continues. If you do not accept it, the installation does not let you proceed further .Ifyou click Finish and exit from the installation, no changes ar e made to your system.

6. The Setup Confi guration dialog box describes the setup options and disk space requir ements for this softwar e installation. On W indows NT and W indows 2000 platforms, ClearCase LT supports two installation options:

Typical installation pr ovides all of the featur es of ClearCase LT server or client.

Custom/Full installation provides all of the featur es of the Typical installation and also provides contr ol over the ClearCase Administration Option , which when selected creates a Start Menu shortcut for the Rational ClearCase LT Administration Console.

On Windows 98 and W indows Me, ClearCase LT only supports the Typical installation option.

Confirm that you have sufficient free space for the installation. If the amount of free space is less than the amount r equir ed, either exit fr om the installation and make mor e space available on the specified disk or specify an alternative install path. T o specify another installation path, type the new path in the Install Path box or click Browse to select a drive and dir ectory.

2 - Installing Rational ClearCase LT 13

NOTE: The setup procedur e installs Microsoft Core Components and some additional files on

drive C, even if you have specified another drive for installation. These files can r equir e up to 20 MB of disk space on drive C.

The installation pr ogram r equir es that all Rational Suite pr ograms be installed in the same directory. If any Rational Suite has been pr eviously installed with the Rational Softwar e Setup pr ogram, the Browse button and Install Path box ar e unavailable. Y ou must r emove and r einstall Rational Suite to specify a new Install Path.

7. The Update Shared Components dialog box appears ifthe Rational Softwar e Setup program needs to update some shar ed files or components on your system. Click Next to have Rational Softwar e Setup install these files for you or click Cancel to install these files yourself.

NOTE: The Rational Softwar e Setup program does not recalculate the disk space requir ed for

your updated selections.

8. The Upgrade Compatibility dialog box appears if you have older Rational pr oducts installed on your system. See Upgrade Compatibility on page 14 for mor e information.

9. If you are installing a ClearCase LT client or any Rational Suite that includes a ClearCase LT client, the ClearCase LT Server Name dialog box opens. We recommend that you enter the name of the ClearCase LT server now . If you do not know the name of the ClearCase LT server , click Next .

NOTE: Every ClearCase LT client must be configur ed with the name of its ClearCase LT

server . If you skip this step, you must enter the name of the ClearCase LT server in this client’s ClearCase Pr operties pr ogram in Contr ol Panel after the installation is complete.

10. The Confi rmation dialog box displays the product featur es that will be installed. Click Next to begin the installation.

11. An Error Summary dialog box displays errors, warnings, and informational messages from the first part of the softwar e installation. If no errors occurr ed, you do not see this dialog box.

The Rational Softwar e Setup pr ogram writes a log of installation activities. The log file is located in <Install Path>\Rational\RSSetup\RSsetup.log.

12. A Restart W indows dialog box appears if the Rational Softwar e Setup pr ogram needs to restart your computer to complete the installation. Select Restart or Don’t Restart , then click Finish . If you select Don’t Restart , a message r eminds you that the installation cannot complete until W indows r estarts.

14 Installation Guide: Rational ClearCase LT

13. After W indows r estarts, log on as the same user. If you do not, the installation does not complete correctly. The second part of the installation process starts automatically after you log on.

14. Another Error Summary dialog box displays errors, warnings, and informational messages from the second part of the softwar e installation. If no err ors occurr ed, you do not see this dialog box.

15. When the Installation Complete dialog box appears, click Finish . We recommend that you review the Release Notesfor Rational ClearCase LT. They contain the most curr ent information r elated to ClearCase LT featur es and known issues.

16. After the installation completes, the ClearCase LT Server Setup Wizard starts automatically if you ar e installing a ClearCase LT server that needs to be configur ed for first use. See Running the Server Setup W izard on page 17 for mor e information.

Upgrade Compatibility

The Upgrade Compatibility dialog box appears if you have older Rational products installed on your system. Because Rational tools shar e files and components, this installation can cause the older Rational pr oducts to stop working. Y ou will see no visual clue to indicate that these products may be compr omised.

For each of the older products listed, we strongly recommend that you take one of the following actions:

Upgrade it: Complete this installation, and then r estart the Setup pr ogram to upgrade the next pr oduct. Upgrading a pr oduct updates all necessary files, r egistry entries, startup menu items, and shar ed components on your system.

Remove it: Complete this installation, and then use the Add/Remove Programs tool on the Contr ol Panel to r emove the next pr oduct. Removing a pr oduct deletes files, r egistry entries, and startup menu items fr om your system.

More information about interactions between specific products is available on the Rational Web site at www .rational.com/support/products/clearcase.jsp .

2 - Installing Rational ClearCase LT 15

2.2 Other Installation Options

This section contains information about other types of installations.

Installing ClearCase LT Client as Part of a Rational Suite

If you ar e installing a Rational Suite that includes a ClearCase LT client, you must install a ClearCase LT server befor e the client can be used. No Rational Suite installs a ClearCase LT server . Follow the procedur e for Installing ClearCaseLT with Rational SoftwareSetup on page 11 to install the server , either befor e or after you install any Suite that includes a ClearCase LT client.

Installing ClearCase LT for Evaluation Purposes

If you are installing ClearCase LT for evaluation purposes, either as a stand-alone product or as part of a Rational Suite, you may want to install the ClearCase LT server and the Rational Suite on the same host to simplify the evaluation pr ocess. To set up a single-system evaluation configuration:

Follow the pr ocedur e described in Installing ClearCase LT with Rational Software Setup on page 11 to install the ClearCase LT server . This pr ocedur e installs a client and a server . You may use this configuration for evaluating ClearCase LT as a stand-alone pr oduct.

If you want to evaluate ClearCase LT as part of a Suite, r e-run the Rational Softwar e Setup program and select the Rational Suite you want to evaluate.

Upgrading From a Pre vious Release of ClearCase LT

If you ar e upgrading ClearCase LT at your site:

Upgrade the Clear case LT server first, and then upgrade the clients. In most cases, a client running an older r evision of ClearCase LT softwar e can access a server r unning a newer revision. A client r unning a newer r evision of ClearCase LT softwar e may not be able to access a server r unning an older r evision, or may only be able to access a limited set of server capabilities.

16 Installation Guide: Rational ClearCase LT

Upgrading the Clear case LT server does not af fect VOB or view data. VOBs and views ar e inaccessible during the upgrade pr ocess, but checked-out files and dir ectories may r emain checked out during the upgrade.

If you are upgrading an existing ClearCase LT server , the Server Setup Wizard is not needed and does not r un.

3 - After You Install Rational ClearCase LT 17

3 3 After You Install Rational ClearCase LT

After the initial installation of a Rational ClearCase LT server and ClearCase LT client, you must configur e the server and perform some administrative tasks. These steps are not requir ed if you are upgrading an existing installation.

3.1 Configuring the ClearCase L T Server

After the initial installation of the ClearCase LTserver ,you need to run the Setup Wizard, import any existing files that you want to place under ClearCase LT contr ol, and make any necessary adjustments to the operating envir onment.

Running the Ser ver Setup Wizar d

If you performed the installation as a user who is a member of local administrator ’s group and also a member of the Rational ClearCase Users Group (see WhoCan Install? on page 9),the Server Setup W izard runs when the ClearCase LT server installation completes (after the r estart if one was r equir ed).

However , if you installed ClearCase LT server as a local administrator who is not a member of the Rational ClearCase Users Gr oup, you must log out and log in again as a member of the ClearCase Users Group (but not necessarily a local administrator) before you can run the wizar d. After you log in, click Start > Programs > Rational ClearCase LT Server > Rational ClearCase LT Server Setup W izard .

18 Installation Guide: Rational ClearCase LT

The wizar d creates these items:

Server storage locations for the ClearCase LT databases

A pr oject VOB

A component VOB

An initial UCM pr oject

A VOB requir ed by the ClearCase LT online tutorial

Importing Files into ClearCase

If you are installing ClearCase LT on a server for the first time, you may want to import files and directories from another configuration management system or directly from the file system and put them under ClearCase contr ol.

ClearCase LT provides support for importing data and metadata fr om a variety of thir d-party configuration management and sour ce code contr ol systems. It also pr ovides support for importing or dinary files and dir ectories into ClearCase.

When the Server Setup W izard runs, the Import Files check box is selected by default. If you want to import files into the VOB that was cr eated by the Server Setup W izard, follow the instr uctions in the Import W izard.

Additional Administrative T asks

After you set up the ClearCase LT server , review the pr ocedur es for the administration of VOB and view storage dir ectories described in the Administrator ’s Guide for Rational ClearCase LT.

3 - After You Install Rational ClearCase LT 19

3.2 Configuring ClearCase LT Clients

Several additional configuration steps may be needed on ClearCase LT clients.

NOTE: The ClearCase LT server includes ClearCase LT client softwar e, so these steps apply to the

server as well.

Set the CLEARCASE_PRIMARY_GROUP Environment Variable

As noted in Special Requirements for Server Setup on page 9, ClearCase access contr ols consider a user ’s domain gr oup membership information when determining that user ’s rights to access ClearCase data. Because of a bug in Windows NT, a user who logs on to a domain account may not be assigned the primary group specified by the Windows NT domain account management tools.

To work ar ound this bug, we r ecommend that you set the user envir onment variable CLEARCASE_PRIMAR Y_GROUP to refer to the corr ect primary gr oup. The value of this variable must be the name of an existing domain gr oup that meets all of the following requir ements:

It includes the user as a member .

It appears on the user ’s group list.

If the ClearCase LT server is installed on a UNIX host, the gr oup must match the user ’s primary gr oup on UNIX.

In Special Requirements for Server Setup on page 9, we refer to this gr oup as the ClearCase Users Group.

This envir onment variable must be set on every ClearCase LT client host. On W indows NT systems, you set the value of CLEARCASE_PRIMAR Y_GROUP using the System pr ogram in Contr ol Panel. On W indows 98 or Windows Me systems, you must set value of CLEARCASE_PRIMAR Y_GROUP in the autoexec.bat file on each system r unning ClearCase LT.

For mor e information on the CLEARCASE_PRIMAR Y_GROUP and ClearCase LT access contr ols, see the Administrator ’s Guide for Rational ClearCase LT.

20 Installation Guide: Rational ClearCase LT

Ensure Compatib le Langua ge Settings

If you configur e a ClearCase LT server and ClearCase LT client to use different language settings but one of those settings uses single-byte encoding and the other uses double- or multi-byte encoding, ClearCase LT won’t operate pr operly . In this situation, you must r eset the language envir onment on the client to match the envir onment on the server .

Install Internet Explorer if Necessar y

Several pr ograms installed with ClearCase LT depend on components of Micr osoft Internet Explor er, and will not work unless Internet Explor er has been installed on the system. Y ou can download Internet Explor er from the Micr osoft Web site at www .microsoft.com/windows/IE . For mor e information, see the Release Notesfor Rational ClearCase LT

Creating Views

You need to create views before users can access data on the ClearCase LTserver .How you create them depends on whether your site will be using the Rational Unified Change Management (UCM) or base ClearCase.

To create a development and an integration view in UCM:

1. Click the Rational ClearCase LT icon on your desktop to start ClearCase Explor er.

2. Click the Toolbox tab, click the UCM bar, and then click the Join Project icon to run the Join Project Wizard.

To create a view in base ClearCase:

1. Click the Rational ClearCase LT icon on your desktop to start Clear case Explor er.

2. Click the Toolbox tab, select the Base ClearCase bar, and then click the Create V iew icon.

3 - After You Install Rational ClearCase LT 21

3.3 Removing ClearCase LT

You can choose to r emove ClearCase LT and all ClearCase data, or you can simply r emove ClearCase LT and leave the data in place.

Removing ClearCase LT Software

In the Contr ol Panel, use Add/Remove Programs to remove ClearCase LT.The Rational Softwar e Setup r emoves ClearCase LT from your system.

NOTE: Removing ClearCase LT does not r emove ClearCase LT data fr om your system.

Removing ClearCase LT Data

CAUTION: ClearCase data may be valuable. Do not remove it unless you know that the data is not

important (for example, data that was cr eated for use in an evaluation, or data that also exists outside of ClearCase).

You do not need to r emove ClearCase data fr om a host unless you intend to r einstall ClearCase LT server on this host and want to r erun the ClearCase LT Server Setup W izard to create a new set of VOBs as described in Running the Server Setup Wizard on page 17. If you try to run the ClearCase LT Server Setup W izard on a host fr om which existing VOBs, views, and storage locations wer e not r emoved, and fr om which the r egistry key

HKLM\Software\Atria\ClearCase\CurrentV ersion\ServerSetupComplete

has not been deleted, you may encounter err ors when the Server Setup W izard starts.

To completely remove ClearCase LT data from the ClearCase LT server , take the following steps before you r emove ClearCase LT:

1. Use the ClearCase Administration Console or the cleartool lsvob command to locate all VOBs on the ClearCase LT server . Then use the ClearCase Administration Console or the cleartool rmvob command to r emove the VOBs.

2. Use the ClearCase Administration Console or the cleartool lsview command to locate all views. Then use the ClearCase Administration Console or the cleartool rmview command to remove the views.

22 Installation Guide: Rational ClearCase LT

3. Use the ClearCase Administration Console or the cleartool lsstgloc command to locate all server storage locations on the ClearCase LT server . Then use the ClearCase Administration Console or the cleartool rmstgloc command to r emove the storage locations.

4. To remove r egistry values, use regedit to remove these lines:

HKLM\Software\Atria\ClearCase\CurrentV ersion\ServerSetupComplete

HKLM\Software\Atria\ClearCase\CurrentV ersion\CredmapAllowedDomainList

5. Delete the ClearCase/var directory fr om the installation dir ectory.

ClearCase LT Documentation

After completing the installation of ClearCase LT, refer to the following documents, which ar e available on the Rational Solutions for W indows Online Documentation CD:

Introduction to Rational ClearCase LT

Administrator ’s Guide for Rational ClearCase LT

Release Notes for Rational ClearCase LT