Copyright Gilbarco Inc. 19951

Copyright Gilbarco Inc. 19952Gilbarco Computer Network

Gilbarco Computer Network

Copyright Gilbarco Inc. 19953Typical ClearCase PC

Typical ClearCase PC

Copyright Gilbarco Inc. 19954Our Department Projects

Our Department Projects

¥Developers Do Not Share VOBS¥Developer Responsible for Multiple Code Bases¥Small Embedded Processor Projects(full builds 30-40 minutes)¥Based on Z80/Z180 processors¥Tools - DOS based plus NT command line utilities and Windows NT Editor

Copyright Gilbarco Inc. 19955How Gilbarco Uses ClearCase

How Gilbarco Uses ClearCase

¥Source Code in VOB (but not documents)¥Normally Use Command Line (for speed)¥GUI for Certain Things (when easier)¥Batch Files for Commands (department policy, normally selected options, PC based names, extra warnings)¥omake for building

Copyright Gilbarco Inc. 19956Batch File To Start VIEW

Batch File To Start VIEW

¥Often have multiple VIEWS open for multiple projects (or versions)¥Can add VIEW title to Windows Title Bar¥Same drive letter mapped to a given view¥Optionally can add commands to determine checkouts, etc..¥Attach Windows ICON to �view� batch file

Copyright Gilbarco Inc. 19957Typical VIEW Batch File

Typical VIEW Batch File

echo offREM CRIND BIOS COLOR + combined BIOS DEVELOPMENT VIEWm:cd \cleartool startview color_combined.demcleartool mount \crindREM use O: drive for this viewsubst /d o:subst o: m:\ color_combined.demset o_drive=m:\ color_combined.demo:echo PRESS ENTER IF NO PROBLEM SETTING DRIVE O:pauseREM add title to the command window to help identify windowstart "COLOR + COMBINED development" cmd.exe

Copyright Gilbarco Inc. 19958Gilbarco Users Manual (TOC)

Gilbarco Users Manual (TOC)

¥1 General 1¥1.1 The Purpose of This Document1¥1.2 Definition of Terms 1¥1.3 Related Documents 1¥2 User Information 3¥2.1 Typical Start of a Day�s Work3¥2.1.1 manual Method 3¥2.1.1.1 Activating a VIEW 3¥2.1.1.2 Activating a VOB 3¥2.1.1.3 Setting the Working Directory4¥2.1.2 Setting up Start of Day Bat Command File 4¥2.2 Starting the Window Version WClearCase6¥2.3 Setting the Config Spec (DSEE Thread)6¥2.4 Creating a Branched Element7¥2.5 Creating a VIEW 7¥2.5.1 Creating a VIEW on the NT Server From NT 8¥2.5.2 Deleting a VIEW 8¥3 OMAKE Build Scripts 9¥3.1 makefile 9¥3.1.1 Using makefile 9¥3.1.2 Typical makefile for Programs Built with the HITECH tools 9¥4 Misc. Information 11¥4.1 Clearcase Database 11¥4.1.1 VOB Tag-Names 11¥4.1.2 VIEW Tag-Names 12¥4.2 Creating a Private VOB 12¥4.2.1 Creating a VOB on the NT Server From NT 12

Copyright Gilbarco Inc. 19959Some Gilbarco Policies

Some Gilbarco Policies

¥project VOB on specific server , public¥VOB name registered in documentation - and name no longer than 8 characters¥View storage on user�s PC¥Project View names of form wwww.xxx xxx is the user�s initials¥Branch & label naming conventions¥Label verification & manufacturing releases